bs	Ensure this value has at least %(limit_value)d character (it has %sd).

bs	Ensure this value has at most %(limit_value)d character (it has %sd).

bs	%ss must be unique for %ss %ss.
bs	%ss mora da bude jedinstven za %ss %ss.

bs	and
bs	i

bs	Value %sr is not a valid choice.

bs	This field cannot be null.
bs	Ovo polje ne može ostati prazno.

bs	This field cannot be blank.
bs	Ovo polje ne može biti prazno.

bs	Field of type: %ss
bs	Polje tipa: %ss

bs	Integer
bs	Cijeo broj

bs	{test1}
bs	test1 <div> test2 </div> test3

bs	{test2}
bs	test1 <div> test2 </div> test3

bs	Multibyte test
bs	日本人は日本で話される言語です！

bs	Tabulation test
bs	FIELD FIELD